Tue Jul 29 14:30:38 1997

100*For 10*Mips Vcopy Vadd Viadd Vmul 0

10

20

30

40

50

60

70 76.04

Tela benchmarks, version 1.27

Benchmarks

Million ops/sec

Linux 486/33 SGI R4400/150 IBM Power-2 HP 755 Alpha 240 SGI R8000 This machine

0